DATOS AUTOR

Nombre: Rafael

Apellidos: Lomeña Varo

E-mail: eurocamsuite@yahoo.es

Website: https://calentamientoglobalacelerado.net Título: EL INGENIERO

Género: microrrelato

Año: 2007

EL INGENIERO

 Había pasado la noche tumbado en un banco del parque, con la cabeza recostada  en mi  abrigo enrollado  y cubierto con hojas de  viejos periódicos  que solía recoger de las basuras para leer. Mientras el frío cortante de aquella mañana de diciembre me  iba devolviendo  a la  áspera realidad,  entre las ramas  del árbol  que me cobijaba un rayo de  luz se coló por un instante  despuntando en mi rostro y trayendo a mi mente  gratos recuerdos de  un pasado feliz, vivencias que  apenas si tardaron  unos pocos  minutos en desvanecerse  aplastadas por el  estridente sonido del  tráfico de la ciudad.

 No dejaba  de preguntarme  cómo había  llegado hasta  ese extremo  pero ya  era absurdo volver a reconstruir la línea temporal de mi historia. Jamás pude superar el dolor  de mi mujer  y mi hijo  al perder mi  trabajo, cuando perdimos  nuestro hogar, cuando toda mi vida, entregada al esfuerzo y a mi familia saltó por  los aires en pedazos  y todo por  lo que  había  luchado se esfumó  sin poder  hacer  absolutamente nada para evitarlo.

 Así fue como,  arrastrado en mi  fracaso a un pozo  oscuro y sin  salida, supongo que caí en este vacío infinito que me ahoga cada día sin cejar un solo instante.

Obra registrada en

https://www.safecreative.org/

Código de registro 2010095576067

Código de verificación: 2010095576067-65SARN

https://www.safecreative.org/certificate/2010095576067-65SARN