DATOS AUTOR

Nombre: Rafael

Apellidos: Lomeña Varo

E-mail: eurocamsuite@yahoo.es

Website: https://calentamientoglobalacelerado.net Título: EL ALCORNOQUE

Género: microrrelato

Año: 2014

Obra registrada en: safecreative.org

EL ALCORNOQUE

Desde hacía años,  cada mañana  el agua me visitaba con  alegría. Algunos

días llegaba  desde el cielo  en forma  de lluvia y  otros venía rodando  tierra abajo

desde la cima de  la montaña regando todo lo que encontraba  a su paso. A veces,

se convertía en bellos copos de nieve que se posaban sobre mis  hojas vistiéndome

de un blanco  majestuoso y puro  y otras muchas, las  gotas del rocío refrescaban

mi corteza barnizando  el verde de mis  hojas como lágrimas de  felicidad. Pero un

día, el agua  no llegó. La esperé desde  el cielo, desde la  cumbre de la montaña, y

no llegó. Las gotas del relente  de la mañana tampoco bañaron mis hojas como de

costumbre.

Esperé muchos días, pero  el agua había desaparecido y  el alegre riachuelillo

que discurría a escasos metros de mí acalló su campanilleo para siempre. Mis

hojas se  tornaron frágiles y  quebradizas, perdieron su  viva frescura y  todo a mi

alrededor comenzó a  desvanecerse transformándose en una suerte  de naturaleza

muerta, inerte, vacía  de vida y de color.  Mi corteza se fue  secando poco a poco y

de repente un día dejé de sentir la savia correr por mi cuerpo. Los pájaros dejaron

de visitarme  para cantar  posados sobre mis  ramas y  un día abrasador,  cuando

mis fuerzas  ya no pudieron soportarlo,  un ejército de  termitas comenzó a  vaciar

mis entrañas apagando mi última chispa de vida.

Obra registrada en

https://www.safecreative.org/

Código de Registro: 2011125867230